0102030405028.0

24.0

18:20:20.0

16.0

13:00.0

30.0

12:00.0

11:00.0

7:10:00.0

09:30.0

RA (J2000)

Dec (J2000)

OBSID 00814259000 / DATE-OBS 2018-03-14T19:26:14.1

UVOT Finding Chart