010203040506042.0

38.0

34.0

19:51:30.0

39:00.0

30.0

23:38:00.0

37:00.0

36:00.0

RA (J2000)

Dec (J2000)

OBSID 00814305000 / DATE-OBS 2018-03-14T22:38:19.5

UVOT Finding Chart