0510152048.0

44.0

17:41:40.0

30.0

46:00.0

0:45:00.0

44:00.0

43:30.0

RA (J2000)

Dec (J2000)

OBSID 00814677000 / DATE-OBS 2018-03-16T05:03:02.4

UVOT Finding Chart