024681030.0

13:07:20.0

10.0

30.0

45:00.0

61:44:00.0

43:00.0

42:30.0

RA (J2000)

Dec (J2000)

OBSID 00820513000 / DATE-OBS 2018-03-31T15:50:07.9

UVOT Finding Chart