02468101222.0

18.0

14.0

5:34:10.0

06.0

08:30.0

09:00.0

30.0

-37:10:00.0

11:00.0

RA (J2000)

Dec (J2000)

OBSID 00821881000 / DATE-OBS 2018-04-04T00:47:26.2

UVOT Finding Chart