024681054.0

4:17:50.0

46.0

42.0

56:00.0

30.0

-32:57:00.0

58:00.0

RA (J2000)

Dec (J2000)

OBSID 00828672000 / DATE-OBS 2018-04-25T06:51:44.3

UVOT Finding Chart