101520253035404505.0

5:12:00.0

55.0

11:50.0

19:00.0

30.0

-62:20:00.0

21:00.0

RA (J2000)

Dec (J2000)

OBSID 00831816000 / DATE-OBS 2018-05-10T21:05:16.9

UVOT Finding Chart