0102030405010.0

14:18:00.0

17:50.0

26:00.0

30.0

27:00.0

-62:28:00.0

29:00.0

RA (J2000)

Dec (J2000)

OBSID 00831888000 / DATE-OBS 2018-05-11T08:59:50.3

UVOT Finding Chart