02468101212.0

06.0

14:06:00.0

03:00.0

30.0

-43:04:00.0

05:00.0

06:00.0

RA (J2000)

Dec (J2000)

OBSID 00840853000 / DATE-OBS 2018-06-13T15:50:54.6

UVOT Finding Chart