051015202526.0

23.0

21:12:20.0

19:00.0

30.0

-2:20:00.0

21:00.0

RA (J2000)

Dec (J2000)

OBSID 00844192000 / DATE-OBS 2018-06-24T13:51:59.7

UVOT Finding Chart