02468101217:30.0

3:16:00.0

14:30.0

27:00.0

30.0

28:00.0

29:00.0

-87:30:00.0

RA (J2000)

Dec (J2000)

OBSID 00845443000 / DATE-OBS 2018-06-30T11:26:50.1

UVOT Finding Chart