051015202530354050.0

2:10:40.0

30.0

20.0

58:00.0

69:57:00.0

56:00.0

55:30.0

RA (J2000)

Dec (J2000)

OBSID 00846088000 / DATE-OBS 2018-07-04T06:31:18.6

UVOT Finding Chart