01234567856.0

53.0

23:10:50.0

47.0

30.0

52:00.0

51:00.0

4:50:00.0

RA (J2000)

Dec (J2000)

OBSID 00849018000 / DATE-OBS 2018-07-21T11:09:09.5

UVOT Finding Chart