01234567814.0

1:43:10.0

06.0

02.0

28:00.0

30.0

29:00.0

-17:30:00.0

31:00.0

RA (J2000)

Dec (J2000)

OBSID 00851855000 / DATE-OBS 2018-08-05T13:07:54.5

UVOT Finding Chart