024681012141640.0

20.0

16:23:00.0

42:00.0

30.0

41:00.0

74:40:00.0

39:00.0

38:30.0

RA (J2000)

Dec (J2000)

OBSID 00852903000 / DATE-OBS 2018-08-12T08:27:22.2

UVOT Finding Chart