010203040506070809004.0

6:57:00.0

56.0

52.0

56:48.0

30.0

39:20:00.0

19:00.0

18:00.0

17:00.0

RA (J2000)

Dec (J2000)

OBSID 00853882000 / DATE-OBS 2018-08-18T12:34:12.5

UVOT Finding Chart