02468101218.0

14.0

0:31:10.0

06.0

02.0

36:00.0

30.0

37:00.0

-38:38:00.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 00854578000 / DATE-OBS 2018-08-21T16:44:34.7

UVOT Finding Chart