024681012141658.0

54.0

17:54:50.0

46.0

46:30.0

47:00.0

30.0

-25:48:00.0

49:00.0

RA (J2000)

Dec (J2000)

OBSID 00856977000 / DATE-OBS 2018-08-28T19:00:00.2

UVOT Finding Chart