051015202530354045506:04:20.0

16.0

12.0

32:30.0

33:00.0

30.0

-4:34:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 00859421000 / DATE-OBS 2018-09-05T14:00:42.0

UVOT Finding Chart