051015202538.0

34.0

5:07:30.0

26.0

06:30.0

07:00.0

30.0

08:00.0

09:00.0

-25:10:00.0

RA (J2000)

Dec (J2000)

OBSID 00864584000 / DATE-OBS 2018-09-30T12:47:42.8

UVOT Finding Chart