05101520253016:33:20.0

16.0

12.0

35:00.0

30.0

19:34:00.0

33:00.0

32:30.0

RA (J2000)

Dec (J2000)

OBSID 00868427000 / DATE-OBS 2018-10-23T02:07:43.6

UVOT Finding Chart