0510152025303540455048.0

44.0

9:47:40.0

36.0

41:00.0

30.0

14:40:00.0

39:00.0

38:00.0

RA (J2000)

Dec (J2000)

OBSID 00869494000 / DATE-OBS 2018-10-30T01:30:15.8

UVOT Finding Chart