024681012141618202204.0

18:43:00.0

56.0

42:52.0

30.0

58:00.0

27:57:00.0

56:00.0

55:30.0

RA (J2000)

Dec (J2000)

OBSID 00874334000 / DATE-OBS 2018-12-02T06:38:13.0

UVOT Finding Chart