010203040506020.0

16:33:00.0

40.0

32:20.0

30.0

31:00.0

78:30:00.0

29:00.0

28:30.0

RA (J2000)

Dec (J2000)

OBSID 00876016000 / DATE-OBS 2018-12-13T13:37:12.8

UVOT Finding Chart