012345645.0

1:12:40.0

35.0

30.0

25.0

56:00.0

-60:57:00.0

58:00.0

RA (J2000)

Dec (J2000)

OBSID 00880127000 / DATE-OBS 2018-12-29T00:17:04.8

UVOT Finding Chart