05101520253035404534.0

1:59:30.0

26.0

52:00.0

30.0

51:00.0

23:50:00.0

49:00.0

RA (J2000)

Dec (J2000)

OBSID 00882252000 / DATE-OBS 2019-01-06T13:36:37.0

UVOT Finding Chart