0123456738.0

34.0

11:39:30.0

26.0

54:00.0

30.0

18:53:00.0

52:00.0

51:00.0

RA (J2000)

Dec (J2000)

OBSID 00883818000 / DATE-OBS 2019-01-14T19:34:12.3

UVOT Finding Chart