0102030405060708004.0

4:22:00.0

56.0

21:52.0

30.0

33:00.0

19:32:00.0

31:00.0

RA (J2000)

Dec (J2000)

OBSID 00885456000 / DATE-OBS 2019-01-24T03:19:44.3

UVOT Finding Chart