0102030405030.0

20.0

10.0

13:48:00.0

15:00.0

30.0

-63:16:00.0

17:00.0

18:00.0

RA (J2000)

Dec (J2000)

OBSID 00885960000 / DATE-OBS 2019-01-27T00:59:49.9

UVOT Finding Chart