0510152028.0

24.0

1:30:20.0

16.0

30.0

44:00.0

55:43:00.0

42:00.0

RA (J2000)

Dec (J2000)

OBSID 00887512000 / DATE-OBS 2019-02-03T15:46:31.6

UVOT Finding Chart