0.51.52.53.5450.0

12:38:30.0

10.0

30.0

38:00.0

76:37:00.0

36:00.0

35:30.0

RA (J2000)

Dec (J2000)

OBSID 00889748000 / DATE-OBS 2019-02-19T19:43:48.0

UVOT Finding Chart