010203040506070802:40:40.0

30.0

16:00.0

61:15:00.0

14:00.0

13:00.0

RA (J2000)

Dec (J2000)

OBSID 00894557000 / DATE-OBS 2019-03-23T20:45:29.2

UVOT Finding Chart