012345678920:59:00.0

54.0

48.0

58:42.0

30.0

46:00.0

41:45:00.0

44:00.0

43:00.0

RA (J2000)

Dec (J2000)

OBSID 00895479000 / DATE-OBS 2019-03-27T21:31:21.8

UVOT Finding Chart