0246810121416182048.0

44.0

21:39:40.0

36.0

35:00.0

30.0

-46:36:00.0

37:00.0

RA (J2000)

Dec (J2000)

OBSID 00897653000 / DATE-OBS 2019-04-09T13:50:54.1

UVOT Finding Chart