02468101212.0

06.0

7:39:00.0

38:54.0

46:30.0

47:00.0

30.0

-38:48:00.0

49:00.0

RA (J2000)

Dec (J2000)

OBSID 00904394000 / DATE-OBS 2019-05-19T07:40:16.2

UVOT Finding Chart