02468101218.0

14.0

19:50:10.0

06.0

02.0

-32:57:00.0

30.0

58:00.0

59:00.0

-33:00:00.0

RA (J2000)

Dec (J2000)

OBSID 00906654000 / DATE-OBS 2019-06-04T15:03:17.0

UVOT Finding Chart