15.0

12:10:00.0

09:45.0

30.0

15:00.0

67:14:00.0

13:00.0

12:30.0

RA (J2000)

Dec (J2000)

OBSID 00908288000 / DATE-OBS 2019-06-13T04:10:06.3

UVOT Finding Chart