024681012141618202249.0

46.0

43.0

20:21:40.0

37:30.0

-4:38:00.0

30.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 00908329000 / DATE-OBS 2019-06-13T11:01:59.2

UVOT Finding Chart