05101520253030.0

1:52:20.0

10.0

56:00.0

30.0

58:55:00.0

54:00.0

53:00.0

RA (J2000)

Dec (J2000)

OBSID 00912310000 / DATE-OBS 2019-07-01T09:50:46.6

UVOT Finding Chart