051015202524.0

16:47:20.0

16.0

12.0

30.0

18:00.0

27:17:00.0

16:00.0

15:00.0

RA (J2000)

Dec (J2000)

OBSID 00922808000 / DATE-OBS 2019-08-28T13:01:26.0

UVOT Finding Chart