051015202530.0

6:42:20.0

10.0

30.0

33:00.0

32:00.0

31:00.0

59:30:00.0

RA (J2000)

Dec (J2000)

OBSID 00926515000 / DATE-OBS 2019-09-26T09:57:42.8

UVOT Finding Chart