0123452:07:00.0

56.0

52.0

06:48.0

55:00.0

30.0

-36:56:00.0

57:00.0

RA (J2000)

Dec (J2000)

OBSID 00927825000 / DATE-OBS 2019-10-04T18:12:23.3

UVOT Finding Chart