0.51.52.53.558.0

54.0

3:16:50.0

46.0

42.0

36:30.0

37:00.0

30.0

-39:38:00.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 00927839000 / DATE-OBS 2019-10-04T21:38:46.2

UVOT Finding Chart