024681012142:59:00.0

56.0

52.0

58:48.0

49:30.0

-27:50:00.0

30.0

51:00.0

52:00.0

RA (J2000)

Dec (J2000)

OBSID 00928924000 / DATE-OBS 2019-10-11T04:37:37.7

UVOT Finding Chart