0102030405060708045.0

16:20:30.0

15.0

32:00.0

30.0

-73:33:00.0

34:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 00929981000 / DATE-OBS 2019-10-17T14:41:31.9

UVOT Finding Chart