0123456740.0

0:40:30.0

20.0

10.0

07:00.0

30.0

08:00.0

09:00.0

-67:10:00.0

RA (J2000)

Dec (J2000)

OBSID 00931242001 / DATE-OBS 2019-10-24T13:16:28.1

UVOT Finding Chart