510152025303508.0

04.0

21:23:00.0

56.0

22:52.0

19:00.0

30.0

-48:20:00.0

21:00.0

RA (J2000)

Dec (J2000)

OBSID 00931384000 / DATE-OBS 2019-10-25T02:48:36.5

UVOT Finding Chart