05101520253040.0

7:43:30.0

20.0

18:00.0

30.0

19:00.0

-62:20:00.0

21:00.0

RA (J2000)

Dec (J2000)

OBSID 00932595000 / DATE-OBS 2019-10-31T18:45:48.8

UVOT Finding Chart