012345678938.0

34.0

18:45:30.0

26.0

41:00.0

30.0

26:40:00.0

39:00.0

38:00.0

37:30.0

RA (J2000)

Dec (J2000)

OBSID 00945344000 / DATE-OBS 2019-12-20T13:44:34.8

UVOT Finding Chart