02040608010012009:00.0

7:08:00.0

41:30.0

42:00.0

30.0

-83:43:00.0

44:00.0

RA (J2000)

Dec (J2000)

OBSID 00948219000 / DATE-OBS 2020-01-07T19:41:55.6

UVOT Finding Chart